Bently 19000-00-XX-24-02 Power module

1. Basic product information
Model: 19000-00-XX-24-02
Brand: Bently (Bentley)
Country of Origin: USA
Type: Power module
Second, product characteristics and specifications
Function: As an important part of the system, the power module is responsible for providing stable and reliable power support for the entire system, and has the function of system monitoring or control.
Technical specifications:
Working voltage: Usually 220V
Dimensions: The net depth/length of the product is 24.20 cm, the net height of the product is 24.10 cm, and the net width of the product is 2.44 cm
Number of channels: Has 16 channels
3. Application scenarios
The product is widely used in industrial automation, process control, equipment monitoring and other fields to provide reliable power supply and operation status monitoring for various key equipment.
In the electric power, petroleum, chemical, metallurgy and other industries, the power module can help enterprises realize intelligent management of equipment, improve production efficiency and safety.

The article is from the official website of Zhejiang Yiwu Beixun Automation Technology Co., Ltd. Please attach the following link for reprinting: https://www.ywrobots.com

Bently 19000-00-XX-24-02 Power moduleFirst appeared inBeiXun Automation。